1. System Requirements
 a. Machine; x86-compatible DOS machine with math coprocessor, 
    512k RAM, and running MSDOS 5.0 or later.
 b. Path Command; Nuron.bat must be in the path
 c. 3 megabytes of disk space, on disk c:, is sufficient.
 d. The software has mouse support. However, a serial mouse may make 
    the menus operate sluggishly, whereas a bus type mouse may work ok.

2. MLP Network Characteristics;
 a. Activation Functions; Sigmoidal ( Out = 1/(1 + exp(-Net)) ) hidden 
        units and output units.
 b. Hidden layers allowed; 1 or 2
 c. Units per hidden layer; up to 40
 d. Connectivity; Each hidden or output layer connects fully to the 
        previous layer and back to some user-chosen layer. For 
        example, full connectivity is allowed.
